% This file was created by matlab2tikz.
%
\begin{tikzpicture}

\begin{axis}[%
width=2.604in,
height=2.604in,
at={(0.962in,0.66in)},
scale only axis,
point meta min=-0.0235938830592846,
point meta max=0.993939917509565,
axis on top,
xmin=0.5,
xmax=250.5,
tick align=outside,
y dir=reverse,
ymin=0.5,
ymax=250.5,
axis line style={draw=none},
ticks=none,
title style={font=\bfseries},
title={Sharp Image (rcg)}
]
\addplot [forget plot] graphics [xmin=0.5, xmax=250.5, ymin=0.5, ymax=250.5] {img_rcg-1.png};
\end{axis}
\end{tikzpicture}%